CheckSource Plugin Documentation
================================
:author: openSUSE Team at SUSE
:toc:


Introduction
------------
[id="intro"]

This plugin check for usual mistakes and problems in the source
packages submitted by the users.  The core of the analysis is done by
the source-checker Perl script.  This script check, for example, if
there is a changelog file, if there is a proper license in the SPEC
file or if the patch if referenced in the changelog.


Installation
------------
[id="install"]

Clone this repository:

-------------------------------------------------------------------------------
git clone https://github.com/openSUSE/osc-plugin-factory.git
-------------------------------------------------------------------------------

Link the plugin and the library in +~/.osc-plugins+ or +/var/lib/osc-plugins+.

-------------------------------------------------------------------------------
cd osc-plugin-factory
ln -sr ./osc-check_source.py ./osclib ~/.osc-plugins
-------------------------------------------------------------------------------

The program will search also some external scripts (like
check_source.pl) inside the cloned directory (following the symlink).


Command line
------------
[id="cli"]

This program is expected to be executed unattended, usually in a loop
or in a cron job.


Checks done
-----------
[id="checks"]

The most important checks are done in the Perl script source-checker,
and can be enumerated as:

* Check if there are more that one action in the request.

* Check if the request comes from a valid devel project.

* Check if the package have a proper name.

* Check if the service is running in mode='localonly'

* Check if the *.changes file is present.

* Check if there is a SPEC file with the same name of the source
  container.

* No Vendor line is allowed.

* The changelog is updated.

* There is a proper license in the SPEC file.

* The added / deleted patch is documented in the changelog.

* rpmlint report is good.
